Cedera Ringan, David De Gea dan Raphael Varane Segera Comeback ke Tim Utama MU

InfoBola.net – Ada kabar baik diberikan Erik Ten Hag mengenai skuat Manchester United. Ia mengonfirmasi bahwa David De Gea dan Raphael Varane segera comeback ke tim utama mereka.

Varane dan De Gea masuk ke dalam skuat pra musim Manchester United. Mereka juga diturunkan ke starting XI Setan Merah saat menghadapi Liverpool di tengah pekan kemarin.

Namun di laga itu, kedua pemain ini dikabarkan mengalami cedera. Sehingga batang hidung mereka tidak nampak saat MU berhadapan dengan Melbourne Victory.

Ten Hag baru-baru ini memberikan update terbaru seputar kondisi De Gea dan Varane. Ia memastikan kedua pemain itu tidak mengalami cedera yang serius.

Simak komentar lengkap sang pelatih di bawah ini.

Sudah Berlatih

Diwawancarai setelah pertandingan melawan Melbourne Victory, Ten Hag memberikan update seputar De Gea.

Ia menyebut cedera sang kiper tidaklah parah. Sehingga ia kini sudah berlatih penuh di skuat Setan Merah.

“Ya, di laga melawan Liverpool dia [De Gea] sempat terjatuh, namun ia sudah berlatih kembali. Ia sudah kembali bersama kami jadi tidak ada yang perlu dikhawatirkan,”

Segera Kembali

Ten Hag juga memberikan informasi terkait Raphael Varane. Ia juga mengonfirmasi sang bek juga mengalami cedera ringan.

Namun ia menyebut sang bek masih belum berlatih, namun ia menyebut sebentar lagi Varane akan kembali berlatih.

“Rapha juga sudah berlatih, namun ia mengalami sedikit masalah. Namun saya rasa ia akan segera kembali berlatih lagi,” ujarnya.

Menang Besar

Manchester United sendiri berhasil meraih kemenangan besar melawan Melbourne Victory.

Setan Merah berhasil mengalahkan tim asal Australia itu dengan skor 4-1.

Sumber : Bola.Net

Baca Juga :

Awal Pekan Depan, Bremer Jadi Pemain Inter?

Jika tak Gercep, MU Bisa Kena Tikung Liverpool Dalam Perburuan Antony

The post Cedera Ringan, David De Gea dan Raphael Varane Segera Comeback ke Tim Utama MU appeared first on INFORMASI SEPAK BOLA TERLENGKAP - INFOBOLA.NET.