Kondisi Aman, Raphael Varane Siap Turun Menghadapi Burnley

infobola.net – Manajer interim Manchester United, Ralf Rangnick membeberkan kondisi Raphael Varane. Ia mengonfirmasi sang bek fit untuk bermain melawan Burnley.

Manchester United akan bertandang ke Turf Moor. Mereka akan berhadapan dengan Burnley di lanjutan Premier League.

Jelang laga ini ada sejumlah spekulasi terkait situasi Raphael Varane. Pasalnya ia ditarik lebih awal saat pertandingan melawan Middlesbrough.

Rangnick memastikan kondisi sang bek aman-aman saja dan siap bermain. “Saya rasa ia pulih tepat waktu,” buka Rangnick yang dikutip Manchester Evening News.

Baca komentar lengkap sang manajer di bawah ini.

Kondisi Prima

Menurut Rangnick, kondisi Varane sejauh ini sangat baik. Jadi ia bisa bermain melawan Burnley.

“Saya rasa kondisi fisiknya sangat fit. Ia juga tidak memiliki masalah apapun dengan cedera saat ini,”

“Sebelum ia kami tarik keluar, ia bermain dengan baik saat diduetkan dengan Harry [Maguire] melawan tim Championship yang ambisius,”

Berikan Kontribusi

Rangnick sendiri menaruh harapan besar kepada Raphael Varane. Ia ingin sang bek bisa kembali tampil oke di skuatnya.

Ia percaya bahwa sang bek bisa menjadi pembeda bagi skuat Setan Merah di laga tersebut.

“Saya senang bisa memainkannya di pertandingan besok. Semoga ia bisa tampil dengan baik di beberapa pertandingan ke depan,” ujarnya.

Pincang

Manchester United dipastikan sedikit pincang melawan Burnley. Karena ada beberapa pemain mereka yang absen di laga ini.

Salah duanya adalah Alex Telles dan Fred. Kedua pemain ini harus absen sejenak karena positif COVID-19.

Sumber : bola.net

Baca juga :

Klasemen Golden Shoe 2021/22: Messi dan Ronaldo Hilang, Vlahovic Kejar Lewandowski

The post Kondisi Aman, Raphael Varane Siap Turun Menghadapi Burnley appeared first on INFORMASI SEPAK BOLA TERLENGKAP - INFOBOLA.NET.